h1 Entries 2751 Mean 1513 RMS 1282 / ndf

2χ 107.8 / 97 p0 2.63± 82.04 p1 110.6 ± 1631 p2 1.18± 1.17

0 1000 2000 3000 4000 5000 0 10 20 30 40 50 60 70 80 90

±

muon_lifetime